; This is a CommonFx file for ikemen. 
; It's meant to handle some system fx and sfx (dizzy, guardbreak) outside of the default fightfx and common.snd to ensure backwards compatibility with preexisting mugen hitsparks.
; You can disable this file from fight.def
[Info]
prefix = GO; This prefix is to used instead of "F" when calling animations or sounds from this file.
fx.scale = 1

[Files]
sff = gofx.sff; Complementary to fightfx.sff
air = gofx.air; Complementary to fighfx.air
snd = gofx.snd; Complementary to common.snd